UPDATE data_universe_ds2 SET IsMajorSec = 'Y' WHERE SecCode = 14280 AND Type_ = 1;
UPDATE data_universe_ds2 SET IsMajorSec = 'N' WHERE SecCode = 14281 AND Type_ = 1;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'MICHAEL PAGE PLC ORD GBP0.01' WHERE SecCode = 31560 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapEndDate = '2026-07-23' WHERE SecCode = 49578 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 70467 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 73754 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsTypeCode = 'EQ' WHERE SecCode = 76806 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'GOODMAN NZ LTD & G NPV STAPLED' WHERE SecCode = 78081 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 80894 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 81730 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BNBWTH5' WHERE SecCode = 82333 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-07-23', SecMapEndDate = '2026-07-23' WHERE SecCode = 83485 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 87665 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 89550 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ALTORO METALS LTD NPV', SecMapEndDate = '2079-06-06' WHERE SecCode = 92639 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'SKYLAND PETROL GRP NPV' WHERE SecCode = 94787 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 125539 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 126529 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 126634 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'B1H69N3' WHERE SecCode = 180020 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 331996 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 395048 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 400273 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 411896 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 516194 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 536888 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 547478 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1121968 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BMV9N11' WHERE SecCode = 1708986 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 2283967 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BTNP4Q8' WHERE SecCode = 2499278 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 2827910 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchQtStartDate = '2015-05-18' WHERE SecCode = 2899614 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchMnem = 'HNX' WHERE SecCode = 2935048 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'YESUN TECH CO LTD KRW500' WHERE SecCode = 3247331 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3272839 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchMnem = 'HNX' WHERE SecCode = 3354563 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3883680 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4542562 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4752161 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsTypeCode = 'NVDR' WHERE SecCode = 4756590 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BXQ15X5' WHERE SecCode = 5527280 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BXQ13Y2' WHERE SecCode = 6137602 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BTNP4P7' WHERE SecCode = 6456244 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PATTERSON METALS CORP COM SHS' WHERE SecCode = 11061719 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BRCB4B8' WHERE SecCode = 11193523 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BXW27L4' WHERE SecCode = 11211489 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BXW27H0' WHERE SecCode = 11224254 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BVPL316' WHERE SecCode = 11275656 AND Type_ = 1;
