/*!40101 SET NAMES binary*/;
/*!40014 SET FOREIGN_KEY_CHECKS=0*/;

/*!40103 SET TIME_ZONE='+00:00' */;
CREATE TABLE `data_universe_exchanges` (
  `ISO2` char(2) NOT NULL,
  `ISO3` char(3) DEFAULT NULL,
  `exchMnem` char(3) NOT NULL,
  `countryName` varchar(50) DEFAULT NULL,
  `exchName` varchar(30) DEFAULT NULL,
  PRIMARY KEY (`ISO2`,`exchMnem`),
  KEY `ISO3` (`ISO3`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3;
