DELETE FROM data_universe_ds2 WHERE SecCode = 115382 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578390 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578391 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578392 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6755830 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6813917 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 11152008 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11296557 AND Type_ = 1;
