DELETE FROM data_universe_ds2 WHERE SecCode = 6578390 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578391 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578392 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 10960391 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11235980 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11270668 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11286891 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11296529 AND Type_ = 1;
