DELETE FROM data_universe_ds2 WHERE SecCode = 332820 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11262373 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11267607 AND Type_ = 1;
