DELETE FROM data_universe_ds2 WHERE SecCode = 35707 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 95865 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 137412 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 168671 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 427461 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 3017884 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 3840551 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 4750082 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 5025278 AND Type_ = 10;
