DELETE FROM data_universe_rkd WHERE SecCode = 11293741 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11293776 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11293777 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11295154 AND Type_ = 1;
