DELETE FROM data_universe_ds2 WHERE SecCode = 94429 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 94475 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 96566 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 5315540 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6603637 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6603641 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 11150836 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11203366 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11210071 AND Type_ = 1;
