DELETE FROM data_universe_ds2 WHERE SecCode = 92171 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11163541 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11192816 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11196147 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11214266 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11232358 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11237686 AND Type_ = 1;
