UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA SPONSORED ADR' WHERE SecCode = 13061 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA PREF A' WHERE SecCode = 27902 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA PREF B' WHERE SecCode = 28602 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA COM NPV' WHERE SecCode = 28624 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05' WHERE SecCode = 28992 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'EL.D.MOUZAKIS SA EUR0.5' WHERE SecCode = 38645 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'GOLDEN ENTMT INC COM' WHERE SecCode = 41253 AND Type_ = 1;
UPDATE data_universe_ds2 SET SecMapEndDate = '2026-05-04' WHERE SecCode = 49578 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BPH1RG5' WHERE SecCode = 63566 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 71892 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 73885 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'FIRST PHILIPPINE H PHP10' WHERE SecCode = 74691 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 75057 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 76132 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 76376 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'PEAX SOLUTIONS LTD ILS0.1' WHERE SecCode = 78182 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 78324 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 78583 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'HLB INNOVATION KRW2500' WHERE SecCode = 78986 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 79084 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'FILSYN CORPORATION ''A'' PHP0.5' WHERE SecCode = 79918 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 82499 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 82656 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 86003 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2026-05-04' WHERE SecCode = 87258 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'COSLEAGUER GLOBAL KRW500' WHERE SecCode = 87378 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 87854 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 94620 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'F&J PRINCE HLDGS ''B''PHP1' WHERE SecCode = 98130 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'F&J PRINCE HLDGS ''A''PHP1' WHERE SecCode = 98238 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 98341 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BWH9014' WHERE SecCode = 101281 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'MULVIHILL CAPITAL MANAGEMENT PFD SHS', DsPrimQtSedol = 'BWH8ZW7' WHERE SecCode = 101282 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 115260 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 115666 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 115983 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 123430 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 126259 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 126433 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 126517 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 126583 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 128794 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 131454 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 134905 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 135123 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 136292 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 136499 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 136779 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2026-04-29' WHERE SecCode = 137592 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'NATURE & ENVIRONME KRW5000' WHERE SecCode = 141951 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'KESPION CO LTD KRW1000' WHERE SecCode = 142298 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 144958 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 145633 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 163072 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'HWAIL PHARM KRW 5000' WHERE SecCode = 169669 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 192787 AND Type_ = 10;
UPDATE data_universe_ds2 SET InfoCode = 396953, DsSecCode = 272919, DsCmpyCode = 213670, DsCtryQtStatus = 'S', DsPrimQtSedol = 'B1QGQX3', DsSecDelistDate = NULL, DsExchQtStartDate = '2026-04-24', SecMapStartDate = '2026-04-24', SecMapEndDate = '2079-06-06' WHERE SecCode = 196399 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 243314 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 254713 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 256141 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BQS8PL3' WHERE SecCode = 284217 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 294085 AND Type_ = 10;
UPDATE data_universe_ds2 SET InfoCode = 396954, DsSecCode = 272918, DsCmpyCode = 213669, DsCtryQtStatus = 'S', DsPrimQtSedol = 'B1TR978', DsSecDelistDate = NULL, DsExchQtStartDate = '2026-04-24', SecMapStartDate = '2026-04-27', SecMapEndDate = '2079-06-06' WHERE SecCode = 298038 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 311013 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 317135 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 386484 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BTDBK35' WHERE SecCode = 555050 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 843994 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2024-05-31' WHERE SecCode = 1043297 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'BIOSYSEN HKD0.01' WHERE SecCode = 1239236 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 1399557 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1470576 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 2469416 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 2650080 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 2725363 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 2873693 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 2882462 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 2963471 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'KUMHO HT INC KRW5000' WHERE SecCode = 3026618 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3072605 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3212151 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3256150 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BTQKTR6' WHERE SecCode = 3288678 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3318951 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3397138 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3433638 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BQT2PP8' WHERE SecCode = 3559194 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3663161 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3841574 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3894832 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4087764 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA CEDEAR EACH REPR 4 ADR' WHERE SecCode = 4201658 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4211729 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'HURUM CO LTD KRW500' WHERE SecCode = 4264589 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4443965 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4629357 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4645346 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-04' WHERE SecCode = 4650985 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4736609 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 4821633 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4918578 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapEndDate = '2026-05-04' WHERE SecCode = 5112392 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 5142396 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5195346 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'SENSORVIEW CO LTD KRW100' WHERE SecCode = 5473222 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5489259 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5493583 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 5870946 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'INTL GEMOLOGICAL I INR2' WHERE SecCode = 6047860 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-04' WHERE SecCode = 6100251 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 6173318 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ESENTIA ENGY DEV NPV' WHERE SecCode = 6562724 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'AXIA ENERGIA SA PREF C NPV' WHERE SecCode = 6610302 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2026-05-04' WHERE SecCode = 6622347 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2026-05-04' WHERE SecCode = 6737828 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 6772978 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'CHRONOSCALE CORPORATION COM NEW', DsPrimQtSedol = 'BX565X1' WHERE SecCode = 11072364 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05' WHERE SecCode = 11163321 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'ONTERRIS INC COM' WHERE SecCode = 11210284 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-05-05', SecMapEndDate = '2026-05-01' WHERE SecCode = 11221146 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BWH8ZY9' WHERE SecCode = 11246642 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BW46FP7', SecMapEndDate = '2026-05-03' WHERE SecCode = 11261939 AND Type_ = 1;
UPDATE data_universe_ds2 SET SecMapStartDate = '2024-11-27' WHERE SecCode = 11272086 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'GENERAL CATALYST GBL RESIL M UNIT 04/13/2031' WHERE SecCode = 11295151 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'HEMAB THERAPEUTICS HLDGS INC COM SHS' WHERE SecCode = 11295179 AND Type_ = 1;
UPDATE data_universe_ds2 SET SecMapEndDate = '2024-10-25' WHERE SecCode = 11295198 AND Type_ = 1;
