UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BVWN8M1' WHERE SecCode = 75538 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 86003 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapStartDate = '2012-01-18' WHERE SecCode = 102426 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'FERROVIAL NV EUR0.01' WHERE SecCode = 116223 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapStartDate = '2016-08-29' WHERE SecCode = 333821 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 336162 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, Name = 'HEALTH X PLATFORM INR10' WHERE SecCode = 826905 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchQtStartDate = '2016-12-13' WHERE SecCode = 3192930 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchQtStartDate = '2016-07-13' WHERE SecCode = 3212737 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3213357 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapEndDate = '2079-06-06' WHERE SecCode = 3407480 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'CHIMERIC THERAPEUT NPV' WHERE SecCode = 4470097 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'NOMAD COMPUTE PLC NPV' WHERE SecCode = 5067274 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsExchQtStartDate = '2022-12-02' WHERE SecCode = 5267120 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 5969244 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapEndDate = '2026-04-30' WHERE SecCode = 11205402 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'ALTROVA HEALTH INC COM' WHERE SecCode = 11257858 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'AXO METALS CORP COM' WHERE SecCode = 11278867 AND Type_ = 1;
