DELETE FROM data_universe_ds2 WHERE SecCode = 11033641 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11068804 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11212523 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11213686 AND Type_ = 1;
