UPDATE data_universe_rkd SET ShPerListing = 33743217.0 WHERE SecCode = 7197 AND Type_ = 1;
UPDATE data_universe_rkd SET RkdIssueStatus = 1, PrimaryIssueType = 'PVT' WHERE SecCode = 72133 AND Type_ = 10;
UPDATE data_universe_rkd SET SEDOL = 'BWM2VZ' WHERE SecCode = 82506 AND Type_ = 1;
UPDATE data_universe_rkd SET RkdIssueStatus = 0, RIC = '7250.T^D26' WHERE SecCode = 91772 AND Type_ = 10;
UPDATE data_universe_rkd SET SEDOL = 'BWM2ZR' WHERE SecCode = 96456 AND Type_ = 1;
UPDATE data_universe_rkd SET RkdIssueStatus = 0, RIC = '300391.SZ^D26' WHERE SecCode = 2598695 AND Type_ = 10;
UPDATE data_universe_rkd SET RkdExchCode = 'KON', RkdExchCtry = 'KOR' WHERE SecCode = 3098023 AND Type_ = 10;
UPDATE data_universe_rkd SET RkdIssueStatus = 0, RIC = 'CYB1.ST^D26' WHERE SecCode = 3246340 AND Type_ = 10;
UPDATE data_universe_rkd SET ShPerListing = 14770173.0 WHERE SecCode = 4873567 AND Type_ = 10;
UPDATE data_universe_rkd SET SEDOL = 'BWM315' WHERE SecCode = 11006192 AND Type_ = 1;
UPDATE data_universe_rkd SET RIC = 'CHTH.PK^C26' WHERE SecCode = 11144671 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2VW', CUSIP = '15096430' WHERE SecCode = 11186611 AND Type_ = 1;
UPDATE data_universe_rkd SET ShPerListing = 13.33333 WHERE SecCode = 11188115 AND Type_ = 1;
UPDATE data_universe_rkd SET RkdIssueStatus = 1, PrimaryIssueType = 'PVT' WHERE SecCode = 11190336 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2VS' WHERE SecCode = 11196712 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2W3', CUSIP = '45694820' WHERE SecCode = 11234146 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM30G' WHERE SecCode = 11236900 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2W0', CUSIP = '00971M70' WHERE SecCode = 11239698 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2WK' WHERE SecCode = 11274686 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BTY51W' WHERE SecCode = 11275653 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2W4' WHERE SecCode = 11276630 AND Type_ = 1;
UPDATE data_universe_rkd SET SEDOL = 'BWM2VR' WHERE SecCode = 11279079 AND Type_ = 1;
UPDATE data_universe_rkd SET COATypeCode = 'IND' WHERE SecCode = 11291253 AND Type_ = 1;
UPDATE data_universe_rkd SET COATypeCode = 'IND' WHERE SecCode = 11291582 AND Type_ = 1;
UPDATE data_universe_rkd SET COATypeCode = 'IND' WHERE SecCode = 11292240 AND Type_ = 1;
