UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 81073 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'TOHO SYSTEM SCIENC NPV' WHERE SecCode = 82893 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ARCHION CORP NPV' WHERE SecCode = 83142 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 786648 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-04-03', SecMapEndDate = '2026-04-03' WHERE SecCode = 1459234 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'EBR SYSTEMS INC NPV DFD 10/04/26(EX-SPLT)' WHERE SecCode = 4780386 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'FII RIOB' WHERE SecCode = 6258207 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 6672510 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BS2DWC8' WHERE SecCode = 11198774 AND Type_ = 1;
