DELETE FROM data_universe_ds2 WHERE SecCode = 92193 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 95683 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 10987204 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11196054 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11221773 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11232542 AND Type_ = 1;
