DELETE FROM data_universe_permid WHERE SecCode = 35239 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 52506 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 4027301 AND Type_ = 10;
DELETE FROM data_universe_permid WHERE SecCode = 5760428 AND Type_ = 10;
DELETE FROM data_universe_permid WHERE SecCode = 6263939 AND Type_ = 10;
DELETE FROM data_universe_permid WHERE SecCode = 6625880 AND Type_ = 10;
DELETE FROM data_universe_permid WHERE SecCode = 11196879 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11274992 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11274993 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11278260 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11282165 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11282167 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11282189 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11282194 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288334 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288335 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288336 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288337 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288338 AND Type_ = 1;
DELETE FROM data_universe_permid WHERE SecCode = 11288342 AND Type_ = 1;
