UPDATE data_universe_ds2 SET Name = 'BANK NOVA SCOTIA B C COM' WHERE SecCode = 8274 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'DELUXE CORP MEDIUM TERM NTS COM' WHERE SecCode = 19416 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = '1ST FINL BANCORP COM' WHERE SecCode = 26820 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'KILROY REALTY CORP COM' WHERE SecCode = 39650 AND Type_ = 1;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 40533 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'JEFFERIES FINANCIAL GROUP IN COM' WHERE SecCode = 42064 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 44507 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapEndDate = '2026-01-29' WHERE SecCode = 49579 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 50028 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'VIRGINIA NATL BK CHRLOTSVLE COM' WHERE SecCode = 80134 AND Type_ = 1;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 83114 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 85031 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ASML HLDG NV N Y REGISTRY SHS' WHERE SecCode = 86822 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 87665 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 87703 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 87755 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 99726 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'IDEAL HOLDINGS SA EUR1.55' WHERE SecCode = 100238 AND Type_ = 10;
UPDATE data_universe_ds2 SET SecMapStartDate = '2004-03-16' WHERE SecCode = 104687 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL, DsCtryQtStatus = 'A', DsPrimQtSedol = 'BTZRLM7' WHERE SecCode = 125762 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 126438 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 141332 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PSG CORPORATION PC THB1 (LOCAL)' WHERE SecCode = 165534 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PSG CORPORATION PC THB1 (NVDR)' WHERE SecCode = 165862 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'BROOKFIELD INFRASTRUCTURE PA LP INT UNIT' WHERE SecCode = 335790 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'LOTUS RESOURCES NPV' WHERE SecCode = 455870 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-01-30', SecMapEndDate = '2025-12-01' WHERE SecCode = 1158940 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 1246898 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 2127503 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ASIA STRAT DIGIT HKD0.032' WHERE SecCode = 2804064 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3275891 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 3283975 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BV98QX6' WHERE SecCode = 3436254 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3547243 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3671085 AND Type_ = 10;
UPDATE data_universe_ds2 SET ISIN = NULL WHERE SecCode = 3769451 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-01-30', SecMapEndDate = '2020-07-06' WHERE SecCode = 3811406 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PHOENIX DIGITAL AS PARTICIPATING SHARES NPV (D', DsCtryQtStatus = 'A' WHERE SecCode = 4568495 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'RAPTOR METALS LTD NPV' WHERE SecCode = 4746930 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'SCEPTRE VENTURES INC COM SHS' WHERE SecCode = 10959790 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'ENERSIS CHILE S A SPONSORED ADR' WHERE SecCode = 11158439 AND Type_ = 1;
UPDATE data_universe_ds2 SET SecMapEndDate = '2079-06-06' WHERE SecCode = 11210591 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'BROOKFIELD INFRASTRUCTURE PA 5.125 CL A PFD13' WHERE SecCode = 11212340 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-01-30', SecMapEndDate = '2026-01-29' WHERE SecCode = 11217437 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'BROOKFIELD INFRASTRUCTURE PA 5.00% PFD A 14' WHERE SecCode = 11217476 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2026-01-29', SecMapEndDate = '2026-01-28' WHERE SecCode = 11227251 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'PSYENCE BIOMEDICAL LTD COM SHS' WHERE SecCode = 11235543 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BV9C8L0' WHERE SecCode = 11246758 AND Type_ = 1;
UPDATE data_universe_ds2 SET IsMajorSec = 'N' WHERE SecCode = 11289253 AND Type_ = 1;
UPDATE data_universe_ds2 SET IsMajorSec = 'N' WHERE SecCode = 11289847 AND Type_ = 1;
