DELETE FROM data_universe_rkd WHERE SecCode = 11289053 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11289056 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11289101 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11289178 AND Type_ = 1;
