DELETE FROM data_universe_ds2 WHERE SecCode = 37480 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11213692 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11213799 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11242242 AND Type_ = 1;
