DELETE FROM data_universe_rkd WHERE SecCode = 11286100 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11286104 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11286424 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11287893 AND Type_ = 1;
