DELETE FROM data_universe_ds2 WHERE SecCode = 90274 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 6575272 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578390 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578391 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6578392 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 11186499 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11192167 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11197023 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11237073 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11254916 AND Type_ = 1;
