DELETE FROM data_universe_ds2 WHERE SecCode = 74364 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11028391 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11216860 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11248867 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11250009 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11250138 AND Type_ = 1;
