DELETE FROM data_universe_rkd WHERE SecCode = 11188238 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11285377 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11285908 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11287404 AND Type_ = 1;
