DELETE FROM data_universe_rkd WHERE SecCode = 32562 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 71468 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 78795 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 91239 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 101467 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 147575 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 243470 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 340322 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 1997923 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 2022571 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 2240516 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 2819089 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 2832701 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 2860578 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 3825584 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 5668323 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 10979586 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11276251 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278711 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11281417 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11281954 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11282049 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11284220 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11284440 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11284441 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11284951 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11285141 AND Type_ = 1;
