DELETE FROM data_universe_ds2 WHERE SecCode = 6472078 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6472080 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6472081 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6472082 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6487530 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6515901 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 6515939 AND Type_ = 10;
DELETE FROM data_universe_ds2 WHERE SecCode = 11212108 AND Type_ = 1;
