DELETE FROM data_universe_ds2 WHERE SecCode = 11250425 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11252798 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11253008 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11286863 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11286876 AND Type_ = 1;
