UPDATE model_universe SET PermInstrStatus = 'DC' WHERE SecCode = 10812 AND Type_ = 10;
UPDATE model_universe SET RkdCUSIP = 'G0R30S10' WHERE SecCode = 33323 AND Type_ = 10;
UPDATE model_universe SET PermOrgIPODate = '1965-08-09', startDate = '1965-08-09' WHERE SecCode = 49181 AND Type_ = 10;
UPDATE model_universe SET PermIDTicker = 'NSUG.I', QuotePermID = 21475572974, ExchCode = 'CHI', PermQuoteRetireDate = '2008-01-23', endDate = '2008-01-23' WHERE SecCode = 60647 AND Type_ = 10;
UPDATE model_universe SET RkdTicker = 'PTHH', RkdRIC = 'PTHH.DE', RkdDisplayRIC = 'PTHH.DE', RkdExchCode = 'ETR' WHERE SecCode = 64428 AND Type_ = 10;
UPDATE model_universe SET Name = 'SLB LIMITED COM STK' WHERE SecCode = 68423 AND Type_ = 1;
UPDATE model_universe SET RkdISIN = 'BMG3394P4020', RkdSEDOL = 'BSRJ2J', RkdCUSIP = 'G3394P40', DsPrimQtSedol = 'BSRJ2J8' WHERE SecCode = 79747 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 83995 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 86578 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 86883 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'S' WHERE SecCode = 89829 AND Type_ = 10;
UPDATE model_universe SET Name = 'MERCK TBK IDR50' WHERE SecCode = 91765 AND Type_ = 10;
UPDATE model_universe SET RkdIssueStatus = 1, PrimaryIssueType = 'PVT' WHERE SecCode = 97693 AND Type_ = 10;
UPDATE model_universe SET RkdISIN = 'NO0013682948', RkdSEDOL = 'BW2G21', DsPrimQtSedol = 'BW2G214' WHERE SecCode = 100974 AND Type_ = 10;
UPDATE model_universe SET RkdCUSIP = 'Y973BL11' WHERE SecCode = 104987 AND Type_ = 10;
UPDATE model_universe SET RkdTicker = 'FHB', RkdRIC = 'FHBP.WA', RkdDisplayRIC = 'FHBP.WA' WHERE SecCode = 147359 AND Type_ = 10;
UPDATE model_universe SET Name = 'PSG CORPORATION PC THB3.65 (LOCAL)', PermSecMapEndDate = NULL, endDate = NULL WHERE SecCode = 165534 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'S' WHERE SecCode = 566782 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 860905 AND Type_ = 10;
UPDATE model_universe SET PermInstrStatus = 'DC' WHERE SecCode = 1029006 AND Type_ = 10;
UPDATE model_universe SET Name = 'CAPAI PLC ORD GBP0.0001', PermSecMapEndDate = NULL, endDate = NULL WHERE SecCode = 1478297 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 3247161 AND Type_ = 10;
UPDATE model_universe SET RkdISIN = 'KYG3962W1107', RkdSEDOL = 'BSRJ36', RkdCUSIP = 'G3962W11', DsPrimQtSedol = 'BSRJ362' WHERE SecCode = 3582243 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'S' WHERE SecCode = 3740588 AND Type_ = 10;
UPDATE model_universe SET RkdIssueStatus = 0 WHERE SecCode = 4109394 AND Type_ = 10;
UPDATE model_universe SET Name = 'GENCELL LTD ILS0.01' WHERE SecCode = 4422378 AND Type_ = 10;
UPDATE model_universe SET DsCtryQtStatus = 'A' WHERE SecCode = 4796256 AND Type_ = 10;
UPDATE model_universe SET RkdISIN = 'SA16D0820P10', RkdTicker = '4146', RkdSEDOL = 'BTXY8P', RkdRIC = '4146.SE', RkdDisplayRIC = '4146.SE', DsCtryQtStatus = 'A', DsPrimQtSedol = 'BTXY8P2' WHERE SecCode = 4867401 AND Type_ = 10;
UPDATE model_universe SET RkdCUSIP = 'M6S93J10' WHERE SecCode = 6440013 AND Type_ = 10;
UPDATE model_universe SET COATypeCode = 'IND' WHERE SecCode = 6478390 AND Type_ = 10;
UPDATE model_universe SET Name = 'TIDEWATER MIDSTREAM & INFRAS COM NEW' WHERE SecCode = 11147241 AND Type_ = 1;
UPDATE model_universe SET PermIDTicker = NULL, PermQuoteStatus = 'DC', PermQuoteRetireDate = '2025-10-08', PermSecMapEndDate = '2025-10-08' WHERE SecCode = 11178942 AND Type_ = 1;
UPDATE model_universe SET PermIDTicker = NULL, PermQuoteStatus = 'DC', PermQuoteRetireDate = '2025-10-08', PermSecMapEndDate = '2025-10-08' WHERE SecCode = 11253068 AND Type_ = 1;
