UPDATE data_universe_ds2 SET Name = 'SLB LIMITED CEDEAR EACH 3 REP 1 USD0.01' WHERE SecCode = 29756 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BRBWSJ8' WHERE SecCode = 44550 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'GOLD STRIKE RESOURCES CORP COM' WHERE SecCode = 68072 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'SLB LIMITED COM STK' WHERE SecCode = 68423 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A', DsPrimQtSedol = 'BSNMGK0' WHERE SecCode = 78203 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 79123 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BSRJ2J8' WHERE SecCode = 79747 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'THE INTERNATIONAL THB0.5(NVDR)' WHERE SecCode = 80536 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 83995 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 86578 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'GREENTRONICS TECH MYR1' WHERE SecCode = 86781 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 86883 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 89829 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'MERCK TBK IDR50' WHERE SecCode = 91765 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'ITANZ TECH LTD PKR10' WHERE SecCode = 99380 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BW2G214' WHERE SecCode = 100974 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PSG CORPORATION PC THB3.65 (LOCAL)' WHERE SecCode = 165534 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'PSG CORPORATION PC THB3.65 (NVDR)' WHERE SecCode = 165862 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 566782 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 593629 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 860905 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 897046 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 934966 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'SLB LIMITED BDR EACH 1 REPR 1 COM' WHERE SecCode = 1244631 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1459297 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1464813 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'CAPAI PLC ORD GBP0.0001' WHERE SecCode = 1478297 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1716623 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 1725135 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 2008398 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 2807594 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BSRJ2J8' WHERE SecCode = 2963473 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 3247161 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsPrimQtSedol = 'BSRJ362' WHERE SecCode = 3582243 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 3740588 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4089901 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'FOAMIT OYJ NPV' WHERE SecCode = 4348233 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'GENCELL LTD ILS0.01' WHERE SecCode = 4422378 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 4796256 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A', DsPrimQtSedol = 'BTXY8P2' WHERE SecCode = 4867401 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 5099108 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'D', DsSecDelistDate = '2025-10-09', SecMapEndDate = '2025-10-08' WHERE SecCode = 5218831 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5490563 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5550758 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5573658 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'S' WHERE SecCode = 5623997 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 5626466 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'GREEN & GOLD MINER NPV' WHERE SecCode = 6431509 AND Type_ = 10;
UPDATE data_universe_ds2 SET Name = 'THE BEAUTY TECH GR ORD GBP0.10' WHERE SecCode = 6482833 AND Type_ = 10;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A', DsSecDelistDate = '2025-10-09' WHERE SecCode = 10965216 AND Type_ = 1;
UPDATE data_universe_ds2 SET Name = 'TIDEWATER MIDSTREAM & INFRAS COM NEW' WHERE SecCode = 11147241 AND Type_ = 1;
UPDATE data_universe_ds2 SET DsCtryQtStatus = 'A' WHERE SecCode = 11239663 AND Type_ = 1;
UPDATE data_universe_ds2 SET IsMajorSec = 'Y' WHERE SecCode = 11273822 AND Type_ = 1;
