DELETE FROM data_universe_ds2 WHERE SecCode = 89928 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11037079 AND Type_ = 1;
DELETE FROM data_universe_ds2 WHERE SecCode = 11234904 AND Type_ = 1;
