DELETE FROM data_universe_rkd WHERE SecCode = 51427 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 81118 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 136529 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 1592142 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 3405971 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 3436782 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 4033048 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 4499127 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 4511509 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 4617741 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 4800907 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 5174481 AND Type_ = 10;
DELETE FROM data_universe_rkd WHERE SecCode = 11270921 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11272675 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11273820 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11274425 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11274489 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11274790 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11274901 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11275371 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11275438 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11276821 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11276887 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11276940 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11276941 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277562 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277803 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277844 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277920 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277958 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11277959 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278171 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278229 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278307 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278308 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278351 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278354 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278442 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278478 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278480 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278542 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278690 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11278710 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11279140 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11279266 AND Type_ = 1;
DELETE FROM data_universe_rkd WHERE SecCode = 11279267 AND Type_ = 1;
